

   CLEMDCMP will decompress a Clementine image into one of four possible 
   formats:  
   
       1)  decompressed pds image file, with pds labels, the histogram
             object, and an image object, either the browse image or
             the full image
       2)  decompressed raw image file, no labels
       3)  decompressed gif image file
       4)  decompressed tiff image file
       
       
   The File menu of the CLEMDCMP program contains the following menu items:
   
   Menu Item         Description
   ---------         -----------
   From...           This is the input compressed clementine image file.  This
                     file must be in the JPEG compression scheme that is produced 
                     by the Clementine mission.
                     
   To...             This is the output decompressed clementine image file.  This
                     file will be in one of the above four formats.
                     
                     
                     
   The Parameters menu of the CLEMDCMP program contains the following menu items:  
   
   Menu Item         Description 
   ---------         -----------
   
   Output File       When chosen, this menu item will display a pull-down menu
      Format         which will allow you to choose the output file format, a
                     pds labeled file, a raw unlabeled file, a gif image file
                     or a tiff image file.
                      
   Output File       When chosen, this menu item will display a pull-down menu  
      Type           which will allow you to input the output file type, either
                     the browse image or the full image.
                     
